TRUNCATE `callerids`;
INSERT INTO `callerids` VALUES (1,'2345678901',1,'cli_user_test','2010-01-01 01:01:01',0,'2010-01-01 01:01:01', '2010-01-01 01:01:01', 0, '', 0);